DROP TABLE identifier;

CREATE TABLE systemMetadata (
   guid   text,          -- the globally unique string identifier
   docid  VARCHAR(250),	 -- the local document id #
   rev    INT8,          -- the revision part of the local identifier
   CONSTRAINT systemMetadata_pk PRIMARY KEY (guid)
);

CREATE TABLE identifier (
   guid   text,          -- the globally unique string identifier
   docid  VARCHAR(250),  -- the local document id #
   rev    INT8,          -- the revision part of the local identifier
   CONSTRAINT identifier_pk PRIMARY KEY (guid)
);

/*
 * Register the DataONE schemas
 */
 
INSERT INTO xml_catalog (entry_type, public_id, system_id)
  VALUES ('Schema', 'http://dataone.org/service/types/SystemMetadata/0.5', '/schema/D1_SCHEMA_0_5/systemmetadata.xsd');
INSERT INTO xml_catalog (entry_type, public_id, system_id)
  VALUES ('Schema', 'http://dataone.org/service/types/common/0.5', '/schema/D1_SCHEMA_0_5/common.xsd');
  
/*
 * update the database version
 */
UPDATE db_version SET status=0;

INSERT INTO db_version (version, status, date_created) 
  VALUES ('1.10.0', 1, CURRENT_DATE);

